•

•

•

• •

• • •

•

• • •

•

Time

Y

24681012

1.02.03.04.0

Time series: Y’s

frequency spectrum

0.00.10.20.30.40.5

-10-505

Series: Y

Raw Periodogram

bandwidth= 0.0240562 , 95% C.I. is ( -5.8759 , 17.5667 )dB