0

50

100

time in sec #1 - oxy0001

Intensities (cor)

0 0.02 0.07 0.1 0

50%

100%

Efficiency

0 100 200 300

counts

0 20 40

time in sec #2 - oxy0003

Intensities (cor)

0 0.02 0.05 0.07 0

50%

100%

Efficiency

0 50 100 150 200 250 counts

0

50

100

time in sec #3 - oxy0009

Intensities (cor)

0 0.08 0.24 0.32 0

50%

100%

Efficiency

0 500 1000 counts

0

20

40

time in sec #4 - oxy0013

Intensities (cor)

0 0.04 0.13 0.18 0

50%

100%

Efficiency

0 200 400 600 800 counts

0 100 200

time in sec #5 - oxy0018

Intensities (cor)

0 0.03 0.08 0.11 0

50%

100%

Efficiency

0 100 200 300 400 counts

0 20 40 60

time in sec #6 - oxy0030

Intensities (cor)

0 0.05 0.16 0.22 0

50%

100%

Efficiency

0 500 1000counts

0

50

100

time in sec #7 - oxy0074

Intensities (cor)

0 0.1 0.31 0.41 0

50%

100%

Efficiency

0 500 1000 1500 counts

0 50 100 150

time in sec #8 - oxy0075

Intensities (cor)

0 0.23 0.7 0.94 0

50%

100%

Efficiency

0 2000 4000 6000 8000 counts

0 20 40 60 80

time in sec #9 - oxy0076

Intensities (cor)

0 0.1 0.31 0.42 0

50%

100%

Efficiency

0 500 1000 1500 counts

0 50 100 150

time in sec #10 - oxy0077

Intensities (cor)

0 0.1 0.31 0.41 0

50%

100%

Efficiency

0 500 1000 1500 counts